From db2440e87895a7b319cf7b0f154127b030363280 Mon Sep 17 00:00:00 2001
From: Matthias Andreas Benkard <code@mail.matthias.benkard.de>
Date: Sun, 23 Oct 2022 12:04:13 +0200
Subject: fix(docs): {=> Default}ConsoleHandler.

Change-Id: Iff2eca9531b0a04d2d88088f6411831f0ca05b8e
---
 README.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 86f011d..e8fbaa4 100644
--- a/README.adoc
+++ b/README.adoc
@@ -168,7 +168,7 @@ name `DefaultConsoleHandler` as a handler:
 
 [source,properties]
 ----
-handlers = eu.mulk.quarkus.googlecloud.jsonlogging.logmanager.ConsoleHandler
+handlers = eu.mulk.quarkus.googlecloud.jsonlogging.logmanager.DefaultConsoleHandler
 ----
 
 
-- 
cgit v1.2.3

