From 47df8be6dc1e0927a7b3d690100445865dfa8675 Mon Sep 17 00:00:00 2001
From: Matthias Andreas Benkard <code@mail.matthias.benkard.de>
Date: Sun, 23 Jun 2024 16:24:11 +0200
Subject: test: Add benchmarks.

The benchmarks can be run using 'mvn verify -Pbenchmark'.

Change-Id: I13058f52bea77aa3cb4f1967126c28e1e98d1838
---
 README.adoc | 19 +++++++++++++++++++
 1 file changed, 19 insertions(+)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 6b479ca..7048262 100644
--- a/README.adoc
+++ b/README.adoc
@@ -446,3 +446,22 @@ Result:
   }
 }
 ----
+
+
+== Development
+
+=== Running the Tests
+
+To run the **test suite**, run:
+
+[source,shell]
+----
+$ mvn verify
+----
+
+To run the **benchmarks**, run:
+
+[source,shell]
+----
+$ mvn verify -Pbenchmark
+----
-- 
cgit v1.2.3

