From 090b885b7d6dc82e5ec066dbf81d071086e9ec10 Mon Sep 17 00:00:00 2001
From: Matthias Andreas Benkard <code@mail.matthias.benkard.de>
Date: Sat, 3 Sep 2022 18:23:23 +0200
Subject: Quarkus: Simplify and document on/off toggle.

Change-Id: I90b5879ff99ec54deb17453af709ce2ba7070c0d
---
 README.adoc | 8 ++++++++
 1 file changed, 8 insertions(+)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 27d8cf8..3460598 100644
--- a/README.adoc
+++ b/README.adoc
@@ -63,6 +63,14 @@ dependencies {
 }
 ----
 
+By default the extension is turned on.  You can turn the extension on
+or off explicitly by configuring the `quarkus.log.console.google` key
+in `application.properties`:
+
+[source,properties]
+----
+quarkus.log.console.google = true
+----
 
 == Activation (Other Frameworks)
 
-- 
cgit v1.2.3

